NAME

thrd _equal - compare thread IDs

SYNOPSIS

library "threads" #include <threads.h> int thrd _equal(thrd_t t0, thrd_t t1);

DESCRIPTION

The function thrd _equal() determines whether the two given thread identifiers t0 and t1 are equal.

RETURN VALUES

The function thrd _equal() returns non-zero if t0 and t1 refer to the same thread, otherwise 0 will be returned.

SEE ALSO

thrd_create(3) thrd_exit(3) thrd_yield(3) thrd_detach(3) thrd_join(3) thrd_current(3) thrd_sleep(3)

HISTORY

The thrd _equal() function first appeared in the C11 standard ISO/IEC 9899:2011.

AUTHORS

Jan Adelsbach <jan@jadelsbach.de> thrd_equal(3) Library Functions Manual thrd_equal(3)

Debian May 9, 2020 Debian