NAME

tss_get - get thread specific data SYNOPSIS

library "threads" #include <threads.h> void* tss_get(tss_t *key);

DESCRIPTION

The function tss_get() will obtain the thread-specific data for the given data key. By default the data is NULL if it has not been initialized before. tss_get() can be called from a TSS destructor supplied to tss_create(3).

RETURN VALUES

On success tss_get() will return the thread specific data if it has been set or NULL otherwise. SEE ALSO

tss_create(3) tss_set(3) tss_delete(3) HISTORY

The tss_get() function first appeared in the C11 standard ISO/IEC 9899:2011. AUTHORS

Jan Adelsbach <jan@jadelsbach.de> tss_get(3) Library Functions Manual tss_get(3)

Debian May 9, 2020 Debian